% !TeX root = ../Thesis.tex

%************************************************
\chapter{Implementation}\label{ch:implementation}
%************************************************
\glsresetall % Resets all acronyms to not used

\section{Tracing}

\section{LPA}

\section{Fuzzing}

\subsection{Data Fuzzing}

\subsection{APDU Fuzzing}

\section{CLI}

\lipsum[4]
