% !TeX root = ../Thesis.tex

%************************************************
\chapter{Implementation}\label{ch:implementation}
%************************************************
\glsresetall % Resets all acronyms to not used

\section{Tracing}
\label{sec:tracing}

\section{LPA}
\label{sec:lpa}

\section{Fuzzing}
\label{sec:fuzzing}

\subsection{Data Fuzzing}
\label{subsec:data_fuzzing}

\subsection{APDU Fuzzing}
\label{subsec:apdu_fuzzing}

\section{CLI}
\label{sec:cli}

\lipsum[4]
