% !TeX root = ../Thesis.tex

%************************************************
\chapter{Evaluation}\label{ch:evaluation}
%************************************************
\glsresetall % Resets all acronyms to not used

\section{Design}

\section{Findings}
\label{sec:findings}

\section{estk Firmware Update Application}
\lipsum[5]
